%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\sect{The Wall formula}

Consider a ``piston" of area $A$, 
moving in a ideal-gas chamber. 
Find an expression for the friction coefffcient. 
[See lecture notes]. 

