%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\sect{Definition of power spectrum}

Prove that the Fourier components of a stationary noisy signal have
a variance which is proportional to the time of the measurement.

Show that the coefficient of proportionality is just the power
spectrum (defined as the Fourier transform of the correlation
function).




