%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\sect{Generalize incident current formula for 1D and 2D boxes}

Generalize the equation for ${J}$ incident for the cases of two
dimensional gas and one dimensional gas. in each case, note what is
the 'volume', what are the units of ${J}$ and especially, what is
the geometric factor in the equation.




