%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\sect{Changing random variables $x=\cos(\theta)$}

Assume that the random phase ${\theta}$ has a uniform distribution.
Define a new random variable ${x = \cos \left(\theta\right)}$. What
is the probability distribution of ${x}$ ?



